)^2c

(GeV/ μμM 0 0.5 1 1.5 2

)^2c (dimuons per 50 MeV/ μμM dN/d

200

400

600

800^{= 2.76 TeV, 0-90%} NNs ALICE Pb-Pb c < 3 GeV/ Tp 2.5 < < 4 y 2.5 <

Corr. bkg μμ →ρ μμ →ω μμ →ϕ